From 1273a15bf91fa322915e32d3b6dc6ec916397268 Mon Sep 17 00:00:00 2001
From: Tom Lane <tgl@sss.pgh.pa.us>
Date: Tue, 4 May 2021 13:36:26 -0400
Subject: Disable cache clobber to avoid breaking postgres_fdw termination
 test.

Commit 93f414614 improved a pre-existing test case so that it would
show whether or not termination of the "remote" worker process happened.
This soon exposed that, when debug_invalidate_system_caches_always
(nee CLOBBER_CACHE_ALWAYS) is enabled, no such termination occurs.
That's because cache invalidation forces postgres_fdw connections
to be dropped at end of transaction, so that there's no worker to
terminate.  There's a race condition as to whether the worker will
manage to get out of the BackendStatusArray before we look, but at
least on buildfarm member hyrax, it's failed twice in two attempts.

Rather than re-lobotomizing the test, let's fix this by transiently
disabling debug_invalidate_system_caches_always.  (Hooray for that
being just a GUC nowadays, rather than a compile-time option.)
If this proves not to be enough to make the test stable, we can
do the other thing instead.

Discussion: https://postgr.es/m/3854538.1620081771@sss.pgh.pa.us
---
 contrib/postgres_fdw/sql/postgres_fdw.sql | 16 +++++++++++++---
 1 file changed, 13 insertions(+), 3 deletions(-)

(limited to 'contrib/postgres_fdw/sql/postgres_fdw.sql')

diff --git a/contrib/postgres_fdw/sql/postgres_fdw.sql b/contrib/postgres_fdw/sql/postgres_fdw.sql
index dcd36a9753e..000e2534fc8 100644
--- a/contrib/postgres_fdw/sql/postgres_fdw.sql
+++ b/contrib/postgres_fdw/sql/postgres_fdw.sql
@@ -2795,6 +2795,14 @@ ROLLBACK;
 -- Change application_name of remote connection to special one
 -- so that we can easily terminate the connection later.
 ALTER SERVER loopback OPTIONS (application_name 'fdw_retry_check');
+
+-- If debug_invalidate_system_caches_always is active, it results in
+-- dropping remote connections after every transaction, making it
+-- impossible to test termination meaningfully.  So turn that off
+-- for this test.
+SET debug_invalidate_system_caches_always = 0;
+
+-- Make sure we have a remote connection.
 SELECT 1 FROM ft1 LIMIT 1;
 
 -- Terminate the remote connection and wait for the termination to complete.
@@ -2806,18 +2814,20 @@ SELECT pg_terminate_backend(pid, 180000) FROM pg_stat_activity
 BEGIN;
 SELECT 1 FROM ft1 LIMIT 1;
 
--- If the query detects the broken connection when starting new remote
--- subtransaction, it doesn't reestablish new connection and should fail.
--- The text of the error might vary across platforms, so don't show it.
+-- If we detect the broken connection when starting a new remote
+-- subtransaction, we should fail instead of establishing a new connection.
 -- Terminate the remote connection and wait for the termination to complete.
 SELECT pg_terminate_backend(pid, 180000) FROM pg_stat_activity
 	WHERE application_name = 'fdw_retry_check';
 SAVEPOINT s;
+-- The text of the error might vary across platforms, so only show SQLSTATE.
 \set VERBOSITY sqlstate
 SELECT 1 FROM ft1 LIMIT 1;    -- should fail
 \set VERBOSITY default
 COMMIT;
 
+RESET debug_invalidate_system_caches_always;
+
 -- =============================================================================
 -- test connection invalidation cases and postgres_fdw_get_connections function
 -- =============================================================================
-- 
cgit v1.2.3

