From 93f41461449f917da20af4fa2973f8afe8e6ea6e Mon Sep 17 00:00:00 2001
From: Michael Paquier <michael@paquier.xyz>
Date: Wed, 14 Apr 2021 14:23:53 +0900
Subject: Simplify tests of postgres_fdw terminating connections

The tests introduced in 32a9c0b for connections broken and
re-established rely on pg_terminate_backend() for their logic.  When
these were introduced, this function simply sent a signal to a backend
without waiting for the operation to complete, and the tests repeatedly
looked at pg_stat_activity to check if the operation was completed or
not.  Since aaf0432, it is possible to define a timeout to make
pg_terminate_backend() wait for a certain duration, so make use of it,
with a timeout reasonably large enough (3min) to give enough room for
the tests to pass even on slow machines.

Some measurements show that the tests of postgres_fdw are much faster
with this change.  For example, on my laptop, they now take 4s instead
of 6s.

Author: Bharath Rupireddy
Discussion: https://postgr.es/m/CALj2ACXGY_EfGrMTjKjHy2zi-u1u9rdeioU_fro0T6Jo8t56KQ@mail.gmail.com
---
 contrib/postgres_fdw/sql/postgres_fdw.sql | 26 ++++++--------------------
 1 file changed, 6 insertions(+), 20 deletions(-)

(limited to 'contrib/postgres_fdw/sql/postgres_fdw.sql')

diff --git a/contrib/postgres_fdw/sql/postgres_fdw.sql b/contrib/postgres_fdw/sql/postgres_fdw.sql
index 7487096eac5..74590089bd1 100644
--- a/contrib/postgres_fdw/sql/postgres_fdw.sql
+++ b/contrib/postgres_fdw/sql/postgres_fdw.sql
@@ -2786,27 +2786,14 @@ ROLLBACK;
 -- reestablish new connection
 -- ===================================================================
 
--- Terminate the backend having the specified application_name and wait for
--- the termination to complete.
-CREATE OR REPLACE PROCEDURE terminate_backend_and_wait(appname text) AS $$
-BEGIN
-    PERFORM pg_terminate_backend(pid) FROM pg_stat_activity
-    WHERE application_name = appname;
-    LOOP
-        PERFORM * FROM pg_stat_activity WHERE application_name = appname;
-        EXIT WHEN NOT FOUND;
-        PERFORM pg_sleep(1), pg_stat_clear_snapshot();
-    END LOOP;
-END;
-$$ LANGUAGE plpgsql;
-
 -- Change application_name of remote connection to special one
 -- so that we can easily terminate the connection later.
 ALTER SERVER loopback OPTIONS (application_name 'fdw_retry_check');
 SELECT 1 FROM ft1 LIMIT 1;
 
--- Terminate the remote connection.
-CALL terminate_backend_and_wait('fdw_retry_check');
+-- Terminate the remote connection and wait for the termination to complete.
+SELECT pg_terminate_backend(pid, 180000) FROM pg_stat_activity
+	WHERE application_name = 'fdw_retry_check';
 
 -- This query should detect the broken connection when starting new remote
 -- transaction, reestablish new connection, and then succeed.
@@ -2816,16 +2803,15 @@ SELECT 1 FROM ft1 LIMIT 1;
 -- If the query detects the broken connection when starting new remote
 -- subtransaction, it doesn't reestablish new connection and should fail.
 -- The text of the error might vary across platforms, so don't show it.
-CALL terminate_backend_and_wait('fdw_retry_check');
+-- Terminate the remote connection and wait for the termination to complete.
+SELECT pg_terminate_backend(pid, 180000) FROM pg_stat_activity
+	WHERE application_name = 'fdw_retry_check';
 SAVEPOINT s;
 \set VERBOSITY sqlstate
 SELECT 1 FROM ft1 LIMIT 1;    -- should fail
 \set VERBOSITY default
 COMMIT;
 
--- Clean up
-DROP PROCEDURE terminate_backend_and_wait(text);
-
 -- =============================================================================
 -- test connection invalidation cases and postgres_fdw_get_connections function
 -- =============================================================================
-- 
cgit v1.2.3

