From 35411a878b50b545d2ceaa15c11015d858c83dda Mon Sep 17 00:00:00 2001
From: Tom Lane <tgl@sss.pgh.pa.us>
Date: Thu, 24 Mar 2005 17:22:44 +0000
Subject: Adjust plpython to convert \r\n and \r to \n in Python scripts, per
 recent discussion concluding that this is the Right Thing.  Add regression
 test check for this behavior.  Michael Fuhr

---
 src/pl/plpython/plpython_test.sql | 7 +++++++
 1 file changed, 7 insertions(+)

(limited to 'src/pl/plpython/plpython_test.sql')

diff --git a/src/pl/plpython/plpython_test.sql b/src/pl/plpython/plpython_test.sql
index c78b4aa0c7f..17d6b2e7922 100644
--- a/src/pl/plpython/plpython_test.sql
+++ b/src/pl/plpython/plpython_test.sql
@@ -61,3 +61,10 @@ SELECT join_sequences(sequences) FROM sequences
 -- error in trigger
 --
 
+--
+-- Check Universal Newline Support
+--
+
+SELECT newline_lf();
+SELECT newline_cr();
+SELECT newline_crlf();
-- 
cgit v1.2.3

