From a3a8f237bdac86904053190d0f3b3c541e843456 Mon Sep 17 00:00:00 2001
From: Tom Lane <tgl@sss.pgh.pa.us>
Date: Mon, 28 Jul 2008 18:45:05 +0000
Subject: Update 8.1 and 8.0 plpython to work with Python 2.5.  This backports
 several fixes made during the 8.2 development cycle, but not backported at
 the time for lack of confidence in the new coding.

I didn't touch 7.4 because it has more problems than this: the configure
probe for Python fails.
---
 src/pl/plpython/sql/plpython_function.sql | 1 -
 1 file changed, 1 deletion(-)

(limited to 'src/pl/plpython/sql/plpython_function.sql')

diff --git a/src/pl/plpython/sql/plpython_function.sql b/src/pl/plpython/sql/plpython_function.sql
index e3ec2afe014..70e681d42c1 100644
--- a/src/pl/plpython/sql/plpython_function.sql
+++ b/src/pl/plpython/sql/plpython_function.sql
@@ -58,7 +58,6 @@ CREATE FUNCTION import_succeed() returns text
   import sha
   import string
   import time
-  import whrandom
 except Exception, ex:
 	plpy.notice("import failed -- %s" % str(ex))
 	return "failed, that wasn''t supposed to happen"
-- 
cgit v1.2.3

