From bdc7dd6799ce6effc48de58ca9ecbec82461d8b6 Mon Sep 17 00:00:00 2001
From: Tom Lane <tgl@sss.pgh.pa.us>
Date: Sat, 3 May 2008 02:47:48 +0000
Subject: Fix plpython to not get totally confused by OUT arguments.  (It still
 doesn't support multiple OUT arguments, though.)

Hannu Krosing
---
 src/pl/plpython/sql/plpython_function.sql | 13 +++++++++++++
 1 file changed, 13 insertions(+)

(limited to 'src/pl/plpython/sql/plpython_function.sql')

diff --git a/src/pl/plpython/sql/plpython_function.sql b/src/pl/plpython/sql/plpython_function.sql
index 224d5196a3c..cf01e8e0cdc 100644
--- a/src/pl/plpython/sql/plpython_function.sql
+++ b/src/pl/plpython/sql/plpython_function.sql
@@ -480,3 +480,16 @@ elif typ == 'obj':
 	return type_record
 $$ LANGUAGE plpythonu;
 
+CREATE FUNCTION test_in_out_params(first in text, second out text) AS $$
+return first + '_in_to_out';
+$$ LANGUAGE plpythonu;
+
+-- this doesn't work yet :-(
+CREATE FUNCTION test_in_out_params_multi(first in text,
+                                         second out text, third out text) AS $$
+return first + '_record_in_to_out';
+$$ LANGUAGE plpythonu;
+
+CREATE FUNCTION test_inout_params(first inout text) AS $$
+return first + '_inout';
+$$ LANGUAGE plpythonu;
-- 
cgit v1.2.3

