From 45223fd9cefe483daa4af7740f15c004486636eb Mon Sep 17 00:00:00 2001
From: Peter Eisentraut <peter@eisentraut.org>
Date: Wed, 8 Jan 2020 21:48:44 +0100
Subject: Modernize Python exception syntax in tests

Change the exception syntax used in the tests to use the more current

    except Exception as ex:

rather than the old

    except Exception, ex:

Since support for Python <2.6 has been removed, all supported versions
now support the new style, and we can save one step in the Python 3
compatibility conversion.

Reviewed-by: Tom Lane <tgl@sss.pgh.pa.us>
Discussion: https://www.postgresql.org/message-id/flat/98b69261-298c-13d2-f34d-836fd9c29b21%402ndquadrant.com
---
 src/pl/plpython/sql/plpython_params.sql | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'src/pl/plpython/sql/plpython_params.sql')

diff --git a/src/pl/plpython/sql/plpython_params.sql b/src/pl/plpython/sql/plpython_params.sql
index f580abe53d0..ee75c4dc410 100644
--- a/src/pl/plpython/sql/plpython_params.sql
+++ b/src/pl/plpython/sql/plpython_params.sql
@@ -29,7 +29,7 @@ CREATE FUNCTION test_param_names3(a0 integer) RETURNS boolean AS $$
 try:
 	assert a1 == args[0]
 	return False
-except NameError, e:
+except NameError as e:
 	assert e.args[0].find("a1") > -1
 	return True
 $$ LANGUAGE plpythonu;
-- 
cgit v1.2.3

